INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (1, 0, '系统设置', 'Images\AddGroupFooter_32x32.png', '0111', '1', '1', ', ', 1, '2021-04-10 00:00:00.000', 1, '2021-04-15 18:31:47.843', '0', '0', 'systemsetup'); GO
INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (9, 12, '菜单维护', 'Images\3DStackedArea_32x32.png', 'MES.Form.FrmsysMenu,WinformGeneralDeveloperFrame.dll', '1', '1', '12', 1, '2021-04-11 21:48:43.227', 1, '2021-05-11 09:19:49.060', '1', '0', 'FrmsysMenu'); GO
INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (10, 12, '用户维护', 'Images\AlignBottomRight_32x32.png', 'MES.Form.FrmsysUser,WinformGeneralDeveloperFrame.dll', '1', '1', NULL, 1, '2021-04-12 19:55:17.493', 1, '2021-05-25 11:41:33.597', '1', '0', 'FrmsysUser'); GO
INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (12, 1, '权限维护', 'Images\AddChartPane_32x32.png', '11', '1', '1', ', ', 1, '2021-04-15 18:32:08.960', 1, '2021-04-15 18:32:08.960', '0', '0', 'permission'); GO
INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (13, 1, '系统维护', 'Images\AddChartPane_32x32.png', '0', '1', '1', ',', 1, '2021-04-16 00:00:00.000', 1, '2021-04-16 00:00:00.000', '0', '0', 'systemmain'); GO
INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (14, 13, '参数维护', 'Images\3DLine_32x32.png', 'MES.Form.FrmsysDictType,WinformGeneralDeveloperFrame.dll', '1', '1', '', 1, '2021-04-16 14:07:29.257', 1, '2021-05-11 10:16:17.660', '1', '0', 'FrmsysDictType'); GO
INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (15, 13, '参数维护', 'Images\3DLine_32x32.png', 'MES.Form.FrmsysDictData,WinformGeneralDeveloperFrame.dll', '2', '0', '', 1, '2021-04-16 15:27:27.703', 1, '2021-05-11 09:25:52.027', '1', '0', 'FrmsysDictData'); GO
INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (16, 13, '数据源维护', 'Images\Datasource_32x32.png', 'MES.Form.FrmsysDataBase,WinformGeneralDeveloperFrame.dll', '3', '1', '', 1, '2021-04-17 15:27:31.280', 1, '2021-05-11 09:27:03.260', '1', '0', 'FrmsysDataBase'); GO
INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (17, 13, '数据集维护', 'Images\Database_32x32.png', 'MES.Form.FrmsysDataTable,WinformGeneralDeveloperFrame.dll', '4', '1', '', 1, '2021-04-17 16:07:55.617', 1, '2021-05-11 09:27:16.557', '1', '0', 'FrmsysDataTable'); GO
INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (18, 13, '代码生成', 'Images\3DClusteredColumn_32x32.png', 'WinformGeneralDeveloperFrame.frmSelectDataBase,WinformGeneralDeveloperFrame.dll', '5', '1', '', 1, '2021-04-17 16:09:24.370', 1, '2021-05-11 09:27:27.433', '1', '0', 'frmSelectDataBas'); GO
INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (19, 1, '测试', 'Images\ADateOccurring_16x16.png', '0', '1', '1', ', ', 1, '2021-04-17 16:27:57.713', 1, '2021-04-17 16:34:54.300', '0', '0', NULL); GO
INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (20, 19, '测试', 'Images\3DLine_32x32.png', 'WinformGeneralDeveloperFrame.Test,WinformGeneralDeveloperFrame.dll', '1', '1', '', 1, '2021-04-17 16:28:15.333', 1, '2021-05-11 09:27:48.590', '1', '0', 'Test'); GO
INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (22, 19, '股票', 'Images\3DLine_16x16.png', 'MES.Form.Frmstock,WinformGeneralDeveloperFrame.dll', '3', '1', '', 1, '2021-04-20 16:29:50.540', 1, '2021-05-11 09:27:57.983', '1', '0', 'Frmstock'); GO
INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (23, 19, '测试', '0', 'test.Form.FrmsysMenu,WinformGeneralDeveloperFrame.dll', '0', '1', '11', 1, '2021-04-22 16:33:11.177', 1, '2021-04-25 18:28:16.403', '1', '0', NULL); GO
INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (24, 12, '角色维护', 'Images\3DClusteredColumn_32x32.png', 'MES.Form.FrmsysRole,WinformGeneralDeveloperFrame.dll', '3', '1', '11, 12, 13, 14, 15, 16', 1, '2021-05-07 14:35:42.127', 1, '2021-05-11 09:28:12.663', '1', '0', 'FrmsysRole'); GO
INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (25, 12, '部门维护', 'Images\3DLine_32x32.png', 'MES.Form.FrmsysDept,WinformGeneralDeveloperFrame.dll', '4', '1', '11, 12, 13, 14, 15, 16', 1, '2021-05-07 14:43:16.443', 1, '2021-05-11 09:28:23.077', '1', '0', 'FrmsysDept'); GO
INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (26, 12, '角色功能维护', 'Images\3DLine_16x16.png', 'MES.Form.FrmsysFunction,WinformGeneralDeveloperFrame.dll', '5', '1', '11, 12, 13, 14, 15, 16', 1, '2021-05-07 14:43:57.563', 1, '2021-05-11 09:28:34.933', '1', '0', 'FrmsysFunction'); GO
INSERT INTO [sysMenu]([id], [pid], [name], [icon], [winformType], [sort], [isEnabled], [toolList], [creatorId], [createTime], [editorId], [editTime], [isForm], [isToolBtn], [functionCode]) VALUES (27, 13, '双色球', 'Images\ADateOccurring_16x16.png', 'WinformGeneralDeveloperFrame.FrmSSq,WinformGeneralDeveloperFrame.dll', '4', '1', NULL, 1, '2021-05-17 11:58:04.633', 1, '2021-05-17 11:58:04.637', '1', '0', 'FrmSSq'); GO
