INSERT INTO [sysDataBase]([name], [serverip], [databasename], [connecturl], [username], [passsword]) VALUES ('localhost', '.', 'winformdevfarme', 'Server=.;Database=winformdevfarme;User Id = sa; Password=123456;Connect Timeout = 2', 'sa', '123456'); GO
INSERT INTO [sysDataBase]([name], [serverip], [databasename], [connecturl], [username], [passsword]) VALUES ('localhost1', '.', 'test', 'Server=.;Database=test;User Id = sa; Password=123456;Connect Timeout = 2', 'sa', '123456'); GO
